BR 0 0.2 0.4 0.6 0.8 1

)y/d N BR x (d

-4 10 -3 10 -2 10 -1 10

(99% CL) nΛ Upper limit Preferred BR from theory

= 2.76 TeV NNs Pb-Pb (0-10% central)

ALICE

Branching Ratio (BR)

0 0.2 0.4 0.6 0.8 1

)y/dN

BR x (d

-510

-410

-310

-210

Upper limit H-dibaryon (99% CL) Preferred BR from theory